(rad.) ϕΔ -1 0 1 2 3 4

)ϕΔ C(

0.992

0.994

0.996

0.998 1 1.002

1.004

1.006

1.008

1.01

< 3.0

t,trig

2.0 < p < 2.0

t,assoc

1.0 < p

| < 0.8 η Centrality 0-1%, | | > 1 ηΔ| | > 1} ηΔ {2, |

2,3,4,5 v